-- Revert nodes.status ENUM to the original six values.
-- WARNING: any rows currently in 'blocked_suspect' or 'blocked_confirmed'
-- will be rejected; run only after verifying no nodes are in those states.
ALTER TABLE nodes
  MODIFY COLUMN status
    ENUM('provisioning','probing','up','draining','down','destroyed')
    NOT NULL DEFAULT 'provisioning';
